0 1 2 3 4 5

-1

0

1

-1 -0.5 0 0.5 1

z/[m]

.

x/[m] y/[m]

Neutron source

PSD and λ monitors

PSD and λ monitors

Monochromator Xtal

Sample Analyzer Xtal

PSD and λ monitors

Single detector