17 18 19 20 21 22 23 24 25 0

5

10

15 x 10^7

’OMM’

Intensity

Scan of OMM McStas data Gaussian fit: A=1.4e+08+-4e-11, C:20.7+-0.03, σ :0.55+-0.02