41 42 43 44 45 46 47 48 49 0 0.5 1 1.5 2 2.5 3 3.5 4 x 10^8

’OMM’

Intensity

Scan of OMM McStas data

Gaussian fit: A=3.1e+08+-4e-12, C:45+-0.01, σ :0.58+-0.007