33 34 35 36 37 38 39 40 41 0

5

10

15 x 10^7

’OMM’

Intensity

Scan of OMM McStas data

Gaussian fit:A=1.4e+08+-1e-10, C:36.6+-0.06, σ :0.74+-0.04