-30 -20 -10 0 10 20 30 -20 0 20 10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

X position [cm]

[Output_psd_m] Output_psd.m I I_err N=[12.1612 0.000612617 73838] Min=0; Max=0.0675835; Mean= 0.00084453;

X0=0.0542795; dX=4.18388; Y0=0.0221615; dY=4.19743;

Y position [cm]